DIRO IFT 2425

STATISTIQUES DES NOTES IFT 2425 (H20)

Max Mignotte

DIRO, Département d’Informatique et de Recherche Opérationelle.

http : //www.iro.umontreal.ca/∼mignotte/ift2425/ E-mail : mignotte@iro.umontreal.ca

Figure 1 – Répartition des Notes de l’Intra (20 étudiants).

Figure 2 – Répartition des Notes de l’examen Final (20 étudiants).

Figure 3 – Répartition des Notes de la moyenne des Devoirs (20 étudiants).

Figure 4 – Répartition des Moyennes des notes (20 étudiants).

MOYENNES

moy. TP/100 (25%) Intra/100 (35%) Final/100 (40%) Moy. Lettre Moy. Lettre Mediane 80.65 74.80 78.28 77.65 B+ A-

CORRESPONDANCE NOTES-LETTRES

D+ C- C C+ B- B B+ A- A A+ 45-50 50-55 55-60 60-65 65-70 70-75 75-80 80-85 85-90 90-